The Clipper Ship Era.djvu/458

Exported from Wikisource on October 1, 2024

374

The Clipper Ship Era

and decimal parts of a foot the depths from the under side of the upper deck to the ceiling at the limber strake. In the case of a break in the upper deck, the depths are to be measured from a line stretched in a continuation of the deck. Breadths: Divide each of those three depths into five equal parts, and measure the inside breadths at the following points—viz., at one fifth and at four fifths from the upper deck of the foremost and aftermost depths, and at two fifths and four fifths from the upper deck of the midship depth. Length: At half the midship depth, measure the length of the vessel from the after part of the stem to the fore part of the stern-post; then, to twice the midship depth add the foremost and the aftermost depths; add together the upper and lower breadths at the foremost division, three times the upper breadth, and the lower breadth, at the midship division and the upper and twice the lower breadth at the after division, for the sum of the breadths; then multiply the sum of the depths by the sum of the breadths, and this product by the length, and divide the final product by three thousand five hundred, which will give the number of tons for register" (Young's Marine Dictionary, 1846).

In 1854 this rule was changed by the Merchant Shipping Act, which provided that the actual cubic contents of a vessel's hull should be measured, a registered ton being reckoned as 100 cubic feet. This is known as the Moorsom system, and is still in use and likely to continue. It was adopted by the United States in 1865; Denmark, 1867; Austria, 1871; Germany, France, and Italy, 1873; Spain, 1874; and Sweden, 1875.

The old practice of calculating tonnage in the United States was adapted from the English, and the mode of measurement was as follows:

The length was measured on deck from the fore part of the stem to the after part of the stern-post; the breadth from outside to outside planking at the broadest part of the vessel; the depth of the hold from the plank on deck to the ceiling of the hold. This last measurement was not used, the depth of a vessel for tonnage purposes being assumed to be one half of her breadth. In order

About this digital edition

This e-book comes from the online library Wikisource. This multilingual digital library, built by volunteers, is committed to developing a free accessible collection of publications of every kind: novels, poems, magazines, letters...

We distribute our books for free, starting from works not copyrighted or published under a free license. You are free to use our e-books for any purpose (including commercial exploitation), under the terms of the Creative Commons Attribution-ShareAlike 4.0 Unported license or, at your choice, those of the GNU FDL.

Wikisource is constantly looking for new members. During the transcription and proofreading of this book, it's possible that we made some errors. You can report them at this page.

The following users contributed to this book:

- William Maury Morris II

- Gumr51

- Mudbringer

- ShakespeareFan00

Table of Contents

Title page

The Clipper Ship Era.djvu/458

About